[deg] αΔ -10 -8 -6 -4 -2 0 2 4 6 8 10

Yield

0 20 40 60 80 100 120 140 160 180 200 = 1 GeV/c tp all clusters selection

[deg] αΔ -10 -8 -6 -4 -2 0 2 4 6 8 10

Yield

0 10 20 30 40 50 60 70 80 = 3 GeV/c tp