0 0.2 0.4 0.6 0.8 1 1.2

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

Time (μs)

Pad current (μA)

55Fe

0 50 100 150 200 250

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

Time (μs)

PASA voltage (mV)