1.55 1.6 1.65 1.7 1.75 1.8 1.85 1.9 1.95 2

0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5

Drift time ΜμsΝ

Entries

*10 3_{Underϑ 0, inϑ 9796, overϑ 178}

Sumϑ 10000, Meanϑ 1.77206, RMSϑ 0.070797