-0.25

-0.2

-0.15

-0.1

-0.05 0.0 0.05 0.1 0.15 0.2 0.25 0.3

1.7 1.72

1.74

1.76

1.78 1.8 1.82

1.84

1.86

1.88 1.9 1.92

1.94

1.96

1.98 2 2.02

Drift time

z ΜcmΝ

Drift time ΜμsΝ

Gasϑ Xe 85Ψ, CO_2 15Ψ, T=300 K, p=1 atm

Abnormal Wire 1 Too many steps