-0.25

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2 0.25

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8 3 3.2 3.4 3.6

Drift lines of positive ions from a wire

z-Axis ΜcmΝ x-Axis ΜcmΝ

Gasϑ Xe 85Ψ, CO_2 15Ψ, T=300 K, p=1 atm Isochrone intervalϑ 150 ΜμsecΝ