0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8

716.7

716.75

716.8

716.85

716.9

716.95 717 717.05

717.1

717.15

717.2

717.25

717.4

d ΜcmΝ

E Μv/cmΝ

R_{last} = 785 kΩ

R_{last} = 850 kΩ

R_{last} = 915 kΩ