1150

1200

1250

1300

1350

1400

1450

1500

1550

2 3 4 5 6 7 8 9 10 4

2 3 4 5 6 7 8 9

Anode wire voltage ΜVΝ

Gas gain

h = 2.5 mm

h = 3.5 mm