0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8

702 704 706 708 710 712 714 716 718 720 722 724 726 728 730 732 734 736 738

d ΜcmΝ

E ΜV/cmΝ

z = 5 mm z = 10 mm z = 15 mm z = 20 mm