-160

-140

-120

-100 -80 -60 -40 -20 0 20 40 60 80 100 120 140 160

0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 0.55 0.6

Angle ΜdegreeΝ

Induced charge fraction

0 Λ t Λ 0.5 μs