1150

1200

1250

1300

1350

1400

1450

1500

1550

15 20 25 30 35 40 45 50 55 60 65 70 75 80

Anode voltage ΜVΝ

Anode wire sag ΜμmΝ

h = 2.5 mm

h = 3.5 mm