      ID Name
1 1 TRD DETECTOR
2 2 Technical Design Report

3 3 Radiators

4 3.1 Design&Prototyping
5 3.2 Procurement of Materials

6 3.3 Production

7 4 Chambers

8 4.1 Design & Prototyping
9 4.2 Procurement of Materials

10 4.3 Production & Testing

11 5 Supermodules
12 5.1 Design & Prototyping

13 5.2 Procurement of Materials

14 5.3 Assembly of Supermodules
15 5.4 Stacking & Alignment & Final Testing

16 6 Electronics

17 6.1 PASA

18 6.1.1 Design & Prototyping
19 6.1.2 Production

20 6.1.3 Testing

21 6.2 ADC
22 6.2.1 Design & Prototyping

23 6.2.2 Testing

24 6.2.3 Implementation in Digital Chip
25 6.3 Digital Chip

26 6.3.1 Design & Prototyping

27 6.3.2 Pilot Run

28 6.3.3 Testing of Pilot Run
29 6.3.4 Production

30 6.3.5 Testing

31 6.4 MCM
32 6.4.1 Design & Prototyping

33 6.4.2 Production Pilot Run

34 6.4.3 Testing of Pilot Run
35 6.4.4 Production

36 6.4.5 Testing

37 6.5 Readout Board

38 6.5.1 Design & Prototyping
39 6.5.2 Production

40 6.5.3 Testing

41 6.6 GTU
42 6.6.1 Design & Prototyping

43 6.6.2 Production

44 6.6.3 Testing
45 7 Gas System

46 7.1 Prototype Gas System

47 7.2 Production

48 7.3 Testing
49 8 Cooling System

50 8.1 Design & Prototyping

51 8.2 Production
52 8.3 Testing

53 9 Detector Control System

54 10 Installation
55 10.1 50% of TRD installed

56 10.2 100% of TRD installed

9/12

8/18
5/1

                                                                                                     Qtr 2 Qtr 3 Qtr 4 Qtr 1 Qtr 2 Qtr 3 Qtr 4 Qtr 1 Qtr 2 Qtr 3 Qtr 4 Qtr 1 Qtr 2 Qtr 3 Qtr 4 Qtr 1 Qtr 2 Qtr 3 Qtr 4 Qtr 1 Qtr 2 Qtr 3 Qtr 4 Qtr 1 Qtr 2 Qtr 3

2002 2003 2004 2005 2006 2007