Xe,CO_2(20%), Ud=-3.0 kV

0 200 400 600 800 1000

1200

1400

0 100 200 300

Constant 1290. Mean 60.49 Sigma 5.180

Ua=1.75 kV

Counts

0 200 400 600 800 1000

1200

0 100 200 300

Constant 1088. Mean 87.61 Sigma 7.460

Ua=1.80 kV

0 100 200 300 400 500 600 700 800

0 100 200 300

Constant 679.6 Mean 137.0 Sigma 11.48

Ua=1.85 kV

0 100 200 300 400 500 600

0 100 200 300

Constant 571.8 Mean 210.6 Sigma 16.60

Ua=1.90 kV

Pulse Height (mV)