Xe,CO_2(15%), Ud=-2.64 kV, Ua=1.75 kV, p=1 GeV/c

0

5

10

15

20

25

0 2 4 6 8 10 12 14

t_{ΛQΓ} (time bin)

Angle (deg.)

pions

0

5

10

15

20

25

0 2 4 6 8 10 12 14

t_{ΛQΓ} (time bin)

Angle (deg.)

electrons