s=5mm, w=10mm, h=3mm

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

-1 0 1

rΦ position / w

Fraction of charge

fit with: f(x)=a(b+exp(-x^2/2σ^2)) a=0.819 b=-0.0072 σ=0.496