Position y/W

-1.5 -1 -0.5 0 0.5 1 1.5

Qcen/Qtot

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 Measured Sim., wire/plane cath. Sim., plane cath. Mathieson

Pad Response Function