Position y/W

-1.5 -1 -0.5 0 0.5 1 1.5

Qcen/Qtot

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 W=0.65cm

W=0.68cm W=0.71cm W=0.74cm W=0.77cm W=0.80cm

Pad Response Functions